Astronomical Data Analysis Software and Systems VII ASP Conference Series, Vol. 145, 1998 R. Albrecht, R. N. Hook and H. A. Bushouse, eds.

A Parallel Procedure for the Analysis of Long-term Sequences of Light Curves

A. F. Lanza, M. Rodonò^1, U. Becciani and V. Antonuccio Delogu

Osservatorio Astrofisico di Catania, Viale A. Doria, 6 - I 95125 Catania, Italy

Abstract.

We present a parallel procedure which allows us to speed up the modelling of photometric and spectroscopic observations of active binary stars with brightness inhomogeneities on their surfaces. The procedure has been implemented using PVM and is suitable to run on a cluster of non-homogeneous, non-dedicated computers. It is optimized to recognize and assign the data sets requiring the largest computational effort to the most powerful CPUs of the cluster, taking into account the evolution of their performances during the calculation in a fully dynamical way. We report on several tests made with the workstation cluster of Catania Astrophysical Observatory and discuss the advantages of this kind of procedure for data analysis in Astrophysics.

1. Introduction

Binary systems belonging to the RS CVn and BY Dra classes show huge cool spots on their photospheres which are regarded as manifestations of intense magnetic fields by analogy with sunspots (e.g., Tuominen et al. 1991, Strassmeier & Linsky 1996).

The analysis of sequences of light curves spanning a long time interval (at least one or two decades) allows us to detect activity cycles, analogous to the solar 11-year cycle, inferring the overall properties of the stellar dynamos. Moreover, long-term data can be used to estimate the effects of starspots on stellar parameters (Rodonò et al. 1995, Lanza et al. 1997).

We address the problem of modelling a long-term sequence of light curves adopting recently developed tools for parallel computing and using an inhomogeneous cluster of CPUs.

2. Light curve modelling

The reconstruction of the surface map of an active star by using photometric data alone is an ill-posed problem. It is possible to find a unique and stable solution

1Istituto di Astronomia dell’Università degli Studi di Catania, Viale A. Doria, 6 - I 95125 Catania, Italy 67

68 Lanza, Rodonò, Becciani and Antonuccio Delogu

if a priori assumptions on the properties of the picture elements (pixels) of the map are adopted such as the Maximum Entropy (hereinafter ME, e.g., Vogt et al. 1987) and the Tikhonov criteria (hereinafter T, e.g., Piskunov et al. 1990).

The optimized map is found by minimizing the objective function Q consisting of a linear combination of the χ^2 and the regularizing function S: Q = χ^2 + λS. The expressions for χ^2 (which gives the deviation between the fluxes computed from the map and those observed) and the regularizing ME or T functions can be found in, e.g., Cameron (1992); the Lagrange multiplier λ measures the relative weights of the a priori assumption and χ^2 in constraining the solution. In our approach the best value of λ is determined by the distribution of the residuals between the observed and the computed fluxes (Lanza et al. 1997; see also Cameron 1992). In any case several solutions are computed for different values of λ in order to find the optimal value through a suitable statistical test.

In the modelling of a light curve sequence it is also of interest to determine the physical parameters of the system components, which may be affected by the presence of spots. In such a case the overall computational problem may become much more complex and time consuming.

3. The parallel procedure

Our parallel procedure was written in standard fortran using the PVM library version 3 and exploits a networked system to perform the analysis of a sequence of N_L light curves. The procedure starts on a main host – the master-host – and the single jobs are automatically spawned on all the systems on which PVM is available. This procedure actually generates a virtual machine (hereinafter VM). We assign the modelling of each light curve with given values of the system parameters and λ to a single system (host) which, at the end of its task, sends the output back to the master-host.

The minimization of the function Q for all the light curves of a given sequence, for fixed values of the system parameters, represents a cycle of the procedure. In general the analysis is not limited to one cycle because we can be interested in the simultaneous determination of one or more system parameters, such as the luminosity ratio of the system (see Rodonò et al. 1995, Lanza et al. 1997). Thus, considering a typical sequence consisting of a few tens of light curves, a few hundred modelling steps (i.e., Q minimizations) are required if λ is held fixed, and up to a few thousand if λ also is varied (see also Wilson 1993).

The procedure is implemented using a master/slave paradigm. The master is the program controlling the execution of the overall analysis and it is running on the master-host. The master performs the following operations in sequence: a) it identifies all available hosts and adds them to the VM; b) it assigns the values to the system parameters and the λ’s for the given cycle; c) it spawns each analysis of the cycle on one of the hosts by choosing it according to the number of normal points in the light curve and the current weights assigned to the hosts; d) it periodically checks whether all the hosts of the VM are running and, in case of a fault, restarts the lost jobs; e) it receives the output files from the hosts which have completed their jobs and updates their current weights; f) at the end of the cycle, according to the task assigned, it ends the execution or starts a new cycle from step b).

Analysis of Long-term Sequences of Light Curves 69

Figure 1. (a) The time of execution on the reference CPU vs. the number of data points in the analysed light curve for the linear test. (b) The speedup vs. the number of equivalent CPUs on which the parallel procedure is running for an ideal, a perfectly load balanced and our real cluster of workstations, respectively.

The estimate of the weight of each host is initially based on the time it takes to analyse a reference light curve and is updated in the course of the calculation using the elapsed times of the previous analyses.

If a task is anomalously ended, the master detects the fault and tries to restart it on the same host. If the fault occurs again or the host is not available, the master deletes the host from the VM, and the analysis is re-scheduled on the first available free host. After a user-defined period, a deleted host can be checked again and, if it is found available, it can be added again to the VM. Therefore the VM configuration changes dynamically and automatically during the run with hosts being added or deleted by the master according to their current availability status.

4. Tests and results

We have performed several tests on the workstation cluster of Catania Astrophysical Observatory analysing a sequence of 18 light curves of the eclipsing binary AR Lacertae (see Lanza et al. 1997).

The purpose of a first test (linear test) has been to study the variation of the computational complexity, as a function of the number of data points in the light curve. Only one processor has been used to run the procedure. It has been a SuperSparc+ processor (clockspeed 50 MHz) and all the results are reported assuming it as the reference processor. As workstation operating system we used Solaris 2.5 and 64 MB RAM were allocated during the entire execution time. The results are shown in Figure 1a. There is evidence that the execution time, and thus the computational complexity, increases linearly with the number of data points in the analysed light curve. In a second test, we analysed a sequence

70 Lanza, Rodonò, Becciani and Antonuccio Delogu

of 18 light curves running in parallel 4 cycles each with a different value of the luminosity ratio and a fixed λ = 0.5, adopting the ME regularization. With this test we sampled the parameter space to optimize the luminosity ratio of the components of the system. The number of processors forming the VM has been increased step by step to find how the speedup increases as a function of the number of CPUs. The results of the test are reported in Figure 1b in terms of equivalent processors, the reference processor being the CPU SuperSparc+ 50 MHz with SPECint92=76.9 and SPECfp92=80.1.

We plot in Figure 1b also the speedup expected for an ideal cluster and a perfectly balanced application, which assumes that all the CPUs begin and end their jobs simultaneously. This case can be realized only on a dedicated cluster. We see that there is no significant degradation of the overall performance with only a slight tendency toward a saturation when the number of CPUs exceeds ∼ 10. This is also a consequence of the fact that the processors we used are rather similar (the maximum difference in their scaled powers is less than 20- 25%).

5. Conclusion

We have presented a very general and simple procedure which exploits a cluster of inhomogeneous computers to significantly speed up the modelling of a sequence of light curves. The same procedure, with only minor modifications, can be applied also to the modelling of spectroscopic or polarimetric data (see, e.g., Milone 1993, Vincent et al. 1993).

Our procedure can use a simple Workstation cluster, not necessarily dedicated, or medium-large parallel systems having a message passing software as PVM. In the near future we plan to produce also an MPI version with an Xbased user interface to monitor processing and make it available as a public domain software for light curve or Doppler Imaging analysis.

References

Cameron A. C., 1992, in P. B. Byrne, D. J. Mullan (Eds.) LNP 397, (Berlin:

Springer-Verlag), 33 Lanza A. F., et al., 1997, A&A, submitted Milone E. F. (Ed.), 1993, Light curve modelling of eclipsing binary stars, (Berlin:

Springer-Verlag) Piskunov N. E., Tuominen I., Vilhu O., 1990, A&A, 230, 363 Rodonò M., Lanza A. F., Catalano S., 1995, A&A, 301, 75 Strassmeier K. G., Linsky J. L. (Eds.), 1996, IAU Symp. 176, (Dordrecht:

Kluwer) Tuominen I., et al. (Eds.), 1991, IAU Coll. 130, (Berlin: Springer-Verlag) Vincent A., Piskunov N. E., Tuominen I., 1993, A&A, 278, 523 Vogt S. S., Penrod N. E., Hatzes A. P., 1987, ApJ, 321, 496 Wilson R. E., 1993, PASP, 106, 921